
	SYNTAX										TYPE: command
		TERM	[logical-name]
				QUERY
				DISPLAY
				HALFDUPLEX | FULLDUPLEX
				VDT | HARDCOPY
				MODEM | NOMODEM
				TRANSLATE | NOTRANSLATE
				XY | YX
				INPUTRATE = number			OUTPUTRATE = number
				WIDTH = number				HEIGHT = number
				OFFSET = number				OVERFLOW = number
				SCROLL = number
				IPC = ZERO | IGNORE | EVEN | ODD | number
				OPC = ZERO | ONE | EVEN | ODD | PASS | number
				FLOWCONTROL | NOFLOWCONTROL
				HIGHWATER = number
				LOWWATER = number
				FCON = number (recommended 17)
				FCOFF = number (recommended 19)
				LINKPARITY = NOPARITY | EVEN | ODD
				LINKLENGTH = 6 | 7 | 8
				LINKSTOP = 1 | 1.5 | 2
				SPCHIGHWATER = number
				NOSPECIALCHARACTER | SPECIALCHARACTER (number [,number...])

	DESCRIPTION
		Display or modify the connection or terminal attributes.  Only
		the terminal attributes may be modified.  If TERM allowed connection
		attributes to be modified, they would only be valid for the connection
		held by the TERM job and would disappear whenever TERM exited.

		Controls need not be typed in completely, only enough characters of
		the keyword must entered to make it unique from the other parameters.
		If a logical name is not given, the attributes of the current terminal
		will be given.

		If no keywords are entered the current settings of the terminal will
		be displayed.  The DISPLAY keyword will cause TERM to display the new
		settings of the terminal after it has been modified.

	REFERENCES
		iRMX 86 and iRMX 286 Device Drivers User's Guides.

	PROBLEMS OR RESTRICTIONS

		iRMX 86 Release 7, iRMX 286 Release 2, or newer are required.

		Connection attributes cannot be changed.

		Does not support translation specifications.
