
	SYNTAX										TYPE: command
		sleep	seconds

	PARAMETERS
		seconds			number of seconds execution will be suspended

	DESCRIPTION
		Suspend execution for the given number of seconds.

	REFERENCES
		None

	AUTHOR
		Alvin Carlson

	PROBLEMS OR RESTRICTIONS
		Time needed to load the SLEEP command is not counted in the delay.
