
	SYNTAX										TYPE: command
		skim	pathnames
				QUERY
				TABWIDTH = number

	PARAMETERS
		QUERY			prompt user for permission to process each file
		TABWIDTH		number of spaces in a single horizontal tab

	DESCRIPTION
		SKIM is a filter that allows examination of text one screenfull at
		a time.  It will pause at the bottom of each page, printing
		"more?"; if the user types a carriage return, one more line will be
		displayed.  If the user types a space bar, another screenfull will
		be displayed.  Use ? or H in the SKIM command for addtional command
		characters.

		If the terminal translation is not enabled, the screen commands for
		clear screen and clear line will be simulated.  Long lines will be
		folded, and unprintable characters will be displayed in hexadecimal.

	PROBLEMS OR RESTRICTIONS

		iRMX 86 Release 7, iRMX 286 Release 2 or newer are required.

		The B (back one page) command does a coarse back page using
		seek.  This could stand some improvement.
