
	SYNTAX										TYPE: command
		deviceinfo	devicenames [TO/OVER/AFTER pathnames]

	PARAMETERS
		devicenames	the device names for which volume information is desired.

	DESCRIPTION
		Display the size and space information for the volume described by
		the device names.  Multiple device names may be given.

	PROBLEMS OR RESTRICTIONS
		The 'total files' field is an approximation, since this information
		is not directly available from the system.  It may be high by zero
		to 7 files.
